-- 20260713_add_mailbox_unread_counts.sql
-- 给 notification_stats 加 3 列,业务 emitter 用。
-- 幂等:重复执行无副作用(IF NOT EXISTS)。

ALTER TABLE public.notification_stats
    ADD COLUMN IF NOT EXISTS feedback_replied_unread_count INT NOT NULL DEFAULT 0;

ALTER TABLE public.notification_stats
    ADD COLUMN IF NOT EXISTS report_resolved_unread_count INT NOT NULL DEFAULT 0;

ALTER TABLE public.notification_stats
    ADD COLUMN IF NOT EXISTS target_reported_unread_count INT NOT NULL DEFAULT 0;